Windows 95 Client for SNA Server Setup dialog context-sensitive help file:


Click Local to connect to an SNA Server on the same network domain or SNA Server subdomain as your client computer. You will be prompted for a domain or subdomain name.

Contact your SNA Server administrator if you need assistance with this option.


Click Remote if the SNA Server is not in the same domain or subdomain as your client computer. You will be prompted for the computer names of the primary and backup remote servers.

Contact your SNA Server administrator if you need assistance with this option.


If your machine is using TCP/IP or SPX/IPX to communicate with SNA Server, select one of these protocols for best performance.  If you are using NetBEUI, you must select Named Pipes.


If your machine is using TCP/IP or SPX/IPX to communicate with SNA Server, select one of these protocols for best performance.  If you are using NetBEUI, you must select Named Pipes.


If your machine is using TCP/IP or SPX/IPX to communicate with SNA Server, select one of these protocols for best performance.  If you are using NetBEUI, you must select Named Pipes.


Provides a place for you to type the name of the primary SNA server.

Contact you SNA Server administrator if you do not know the name of the primary SNA server.


Provides a place for you to type the name of the backup SNA server.

Contact you SNA Server administrator if you do not know the name of the backup SNA server.


Provides a place for you to type the name of the local Windows NT network domain or SNA Server subdomain.

Contact your SNA Server administrator if you do not know the name of your domain.